From 1a3e971805c9ef515695f7688ed6000dfafbf369 Mon Sep 17 00:00:00 2001
From: Holden Rohrer <holden.rohrer@gmail.com>
Date: Mon, 21 Oct 2019 22:58:56 -0400
Subject: Network Robustness

---
 progress/Network.tex | 3 +++
 1 file changed, 3 insertions(+)
 create mode 100644 progress/Network.tex

(limited to 'progress/Network.tex')

diff --git a/progress/Network.tex b/progress/Network.tex
new file mode 100644
index 0000000..d165a01
--- /dev/null
+++ b/progress/Network.tex
@@ -0,0 +1,3 @@
+Network connectivity is usually an issue on a local scale: one router or modem or device has a broken component---usually software that needs to be reset in one way or another. However, it rears its head on a very large scale as well: routing connections, as mentioned earlier, relies on the ability to communicate with at least one ``neighbor'' on the network, which is fine unless that neighbor goes down for whatever reason. And in non-decentralized systems, such as modern ISPs, that's exactly what happens: a software bug or power outage or any sort of problem tanks an entire area's coverage for hours to days.
+
+\sinclude Combinatorics Applications:net-apps
-- 
cgit 

