\font\twelverm=ptmr7t at 12pt
\font\twelveit=ptmri7t at 12pt
\font\twelvebf=ptmb7t at 12pt
\font\fourteenbf=ptmb7t at 14pt%for titles only

\def\rm{\twelverm} \def\it{\twelveit} \def\bf{\twelvebf}

%Typesetting
\baselineskip=14.4pt
\rm

%Design Macros
\def\nrule{\smallskip\hrule\smallskip}%better spacing than standard \hrule
\def\\{\hfil\break}
\def\centerline#1{\line{\hfil #1 \hfil}}
\newdimen\tmpdp%temporary depth
\def\uline#1{\hbox{\vbox{\setbox0=\hbox{#1}\tmpdp=\dp0%
  \box0\vskip-.8\tmpdp\vskip1pt\hrule\vskip-1.5pt}}}
\def\title#1{\centerline{\fourteenbf \baselineskip=16.8pt #1}}
\newcount\sectionct \sectionct=1
\def\thesection#1{Section #1:}
\def\sectform#1{\bigskip#1\par\nrule}%consolidates formatting
\def\section#1{\sectform{\thesection{\the\sectionct} #1}\advance\sectionct by 1}

%Header
\\ Holden Rohrer
\\ Engineering
\\ Gathing
\\ 26 Aug 2019

\title{Electrician}
\section{Quick Facts}
\\ \uline{Salary Range}: \$44\kern.5pt--\kern-1pt72.4k
\\ \uline{Degree}: Apprenticeship and Licensure (high school diploma)
\\ \uline{Institutions Offering}: Lincoln College of Tech offers pre-apprentice training

\section{Career Summary}
Electricians are trained in wiring electrical parts for practically every application. They work in homes, wiring outlets and appliances. They also work industrially, wiring commercial buildings, airplanes, and cars. Their training comprises field work, so they can learn to do the safety-centred occupation firsthand. It's safety-centered because electricians' normal activities are very dangerous if attempted by an untrained civilian. A short or damaged wiring can lead to non-working appliances, system breakage (critical in airplanes, for example), and even fires or death---especially in high-voltage applications.

\section{College Facts and Summary}
Lincoln College of Technology is a vocational school with an ``Electrical and Electronic Systems Technology'' course.
\\ \uline{Location}: Marietta, GA
\\ \uline{Entry Requirements}: None; for-profit vocational school
Lincoln Tech's Marietta campus is large, with 30,000 square feet for training, and provides specialists in the electrical field for easy training.
%Source: https://www.lincolntech.edu/campus/marietta-ga

\bye
